\newcommand{\FcombBBSoptzigFabTime}{2.02}
\newcommand{\FcombBBSoptzigExtTime}{1.32}
\newcommand{\FcombBBSoptzigAirTime}{0.70}
\newcommand{\FcombBBSoptzigContactAtcool}{0.34}
