\newcommand{\FcombBASoptfabFabTime}{2.77}
\newcommand{\FcombBASoptfabExtTime}{1.71}
\newcommand{\FcombBASoptfabAirTime}{1.06}
\newcommand{\FcombBASoptfabContactAtcool}{2.71}
