\newcommand{\FcombBBSoptzigFabTime}{2.38}
\newcommand{\FcombBBSoptzigExtTime}{1.62}
\newcommand{\FcombBBSoptzigAirTime}{0.76}
\newcommand{\FcombBBSoptzigContactAtcool}{0.40}
