\newcommand{\FcombBCSoptzigFabTime}{1.56}
\newcommand{\FcombBCSoptzigExtTime}{1.06}
\newcommand{\FcombBCSoptzigAirTime}{0.50}
\newcommand{\FcombBCSoptzigContactAtcool}{0.34}
